-10°

-20°

-30°

0°

0°

10°

10° 20°

20°

30°

30°

40°

40°

50° 60° 70°

40°

40°

50°

50°

60°

Aquaculture production relative to coastline lenght

Tonnes / km

30 - 40

20 - 30

10 - 20

5 - 10

Non EU

< 5

No data